Copyright: Copyright © 2002 Autodesk, Inc. [v.u18.V076] WWP.acad_ctxt1.1.00 adrefman.HLP   Thursday, December 19, 2002 16:07:23


This is a context Help file .. it is not intended to be browsed.


adrefman:EDIT Dialog:HIDC_NEWPATH HIDC_STATIC_NEWPATH
Changes the saved paths of all selected references to the new path name that you enter.


adrefman:EDIT Dialog:HIDC_BROWSE
Displays a tree view in the Browse for Folder dialog box, in which you can specify a new path.


adrefman:EDIT Dialog:HIDOK
Closes the dialog box and retains any changes that you made.


adrefman:EDIT Dialog:HIDCANCEL
Closes the dialog box without retaining any changes that you made.


adrefman:EDIT Dialog:HID_HELP
Displays additional information about this dialog box.


adrefman:SEARCHANDREPLACE Dialog:HIDC_FINDCAPTION_STATIC HIDC_FINDWHAT_EDIT
Finds and selects the references whose path names match the saved reference path that you specify. Only the references that are already selected are searched. This entry filters the saved reference paths of the currently selected references.


adrefman:SEARCHANDREPLACE Dialog:HIDC_FINDWHAT_BROWSE_BUTTON
Displays a tree view in the Browse for Folder dialog box, in which you can specify an existing path.


adrefman:SEARCHANDREPLACE Dialog:HIDC_REPLACECAPTION_STATIC HIDC_REPLACEWITH_EDIT
Changes the saved reference path of the references found to the new path that you enter.


adrefman:SEARCHANDREPLACE Dialog:HIDC_REPLACEWITH_BROWSE_BUTTON
Displays a tree view in the Browse for Folder dialog box, in which you can specify a new saved path.


adrefman:SEARCHANDREPLACE Dialog:HIDC_REPLACEALL_BUTTON
Performs the find and replace operation. Closes the dialog box and retains any changes that you made.


adrefman:SEARCHANDREPLACE Dialog:HIDC_CANCEL_BUTTON
Closes the dialog box without retaining any changes that you made.


adrefman:SEARCHANDREPLACE Dialog:HIDC_HELP_BUTTON
Displays additional information about this dialog box.


adrefman:SEARCHANDREPLACE Dialog:HIDC_FINDANDREPLACEGROUP_STATIC
Locates all references that use a specified path from all the references that you selected, and replaces all occurrences of that path with a new path that you specify.


adrefman:OPTIONS Dialog:HIDC_STATIC_DISPLAY_GRP
Controls several display options.


adrefman:OPTIONS Dialog:HIDC_SHOW_FULLPATH
Displays the path name and file name in the tree view when checked, or displays only the file name in the tree view when cleared.


adrefman:OPTIONS Dialog:HIDC_SHOW_TOOLBAR_TEXT
Displays label text and icons for toolbar buttons when checked, or displays only the toolbar icons when cleared.


adrefman:OPTIONS Dialog:HIDC_COLUMNLIST HIDC_STATIC_COLUMNLIST
Controls the display order and visibility of each column in the Reference list.


adrefman:OPTIONS Dialog:HIDC_WRITELOG
Controls whether the log file is active. When checked, path changes using Reference Manager are recorded and appended to the log file. If the log file has never been used or is missing, a log file is created.


adrefman:OPTIONS Dialog:HIDC_STATIC_LOGFILE
Specifies the file name of the log file. By default, the log file is saved in your My Documents folder.


adrefman:OPTIONS Dialog:HIDC_STATIC_LOGFILE_GRP
Controls the operation of the text file that records all path changes made with Reference Manager.


adrefman:OPTIONS Dialog:HIDC_LOGFILENAME
Specifies the file name of the log file. By default, the log file is saved in your My Documents folder.


adrefman:OPTIONS Dialog:HIDBROWSE
Displays a tree view in the Browse for Folder dialog box, in which you can specify the path to the log file.


adrefman:OPTIONS Dialog:HIDC_STATIC_SETTINGS_GRP
Controls several settings for Reference Manager operation.


adrefman:OPTIONS Dialog:HIDC_STATIC_PROFILE HIDC_PROFILE_COMBO HIDC_PROFILE
Specifies which AutoCAD profile name to use for locating references. AutoCAD profiles store several AutoCAD drawing environment settings in your system registry, including search paths.


adrefman:OPTIONS Dialog:HIDC_INCLUDE_NESTED
When this option is checked, Reference Manager adds all the nested xrefs of a drawing to the tree view when a drawing is added to the tree view. When this option is cleared, only specified drawings are added to the tree view, and any nested xrefs in the drawings must be added individually.


adrefman:OPTIONS Dialog:HIDC_RESTORE_DEFAULTS
Displays all dialog boxes that include a Don't Display This Message Again option. All dialog boxes with warning options are displayed, regardless of previous settings specific to each dialog box.


adrefman:OPTIONS Dialog:HIDC_DOWN
Moves the currently selected column heading down in this selection list and one column to the right when displayed in the Reference list.


adrefman:OPTIONS Dialog:HIDC_UP
Moves the currently selected column heading up in this selection list and one column to the left when displayed in the Reference list.


adrefman:SUMMARY Dialog:HIDC_DETAILS
Displays the Details dialog box with the reference path changes that have been applied. Also lists the reference path edits that were unsuccessful.